-1.5 -1 -0.5 0 0.5 1 1.5 0 200 400 600 800 1000

1200

0 )_S^0(K η

) [pb] S 0(K η/dσd

16GeV

≤^{jet1}_T

10<E

ZEUS (prel.) 96-97 Energy scale uncertainty HERWIG PYTHIA

-1.5 -1 -0.5 0 0.5 1 1.5 0 50 100 150 200 250

0 )_S^0(K η

) [pb] S 0(K η/dσd

23GeV

≤^{jet1}_T

16<E

-1.5 -1 -0.5 0 0.5 1 1.5 0 10 20 30 40 50 60 70

0 )_S^0(K η

) [pb] S 0(K η/dσd

>23GeV

jet1 TE

production 0 SK ZEUS